(deg) ϕ -150 -100 -50 0 50 100 150

nb of events

0

10

20

30

40

50

60

70

80 < 0.01 Bj 0.005 < x

278 events

PRELIMINARY

2 |BH+DVCS| 2 |BH|

(deg) ϕ -150 -100 -50 0 50 100 150

nb of events

0

5

10

15

20

25

30

35 < 0.03 Bj 0.01 < x

134 events

PRELIMINARY

2 |BH+DVCS| 2 |BH|

(deg) ϕ -150 -100 -50 0 50 100 150

nb of events

0

1

2

3

4

5

6

7

8 > 0.03 Bjx 54 events

PRELIMINARY

2 |BH+DVCS| 2 |BH|