(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

100

200

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

-5

0

5

10

15

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

10

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

1

2

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

-0.5

0

0.5

1

1.5

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

2

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

0.1

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

-0.1

0

0.1

0.2

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

0.5

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

-0.005

0

0.005

0.01

0.015

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

0.05

(deg) ϕ 0 50 100 150

rad) 4 nb/(Gev

0

0.2

0.005 < x < 0.01 0.01 < x < 0.02 0.02 < x < 0.03 0.03 < x < 0.07 0.07 < x < 0.13

< 8 2 4 < Q < 4 2 2 < Q < 2 2 1 < Q

VGG reggeized Projected stat. errors