0

2

4

6

8

10^{-4} 10^{-3} 10^{-2} 10^{-1}

B (GeV^{-2})

COMPASS ZEUS ZEUS

Λ Q^2 Γ Λ Q^2 Γ

280 days at 160 GeV = 3.5 GeV^2 = 11 GeV^2

Λ Q^2 Γ Λ Q^2 Γ Λ Q^2 Γ Λ Q^2 Γ

= 1.4 GeV^2 = 2.6 GeV^2 = 5 GeV^2 = 10 GeV^2