0 0.1 0.2 0.3 0.4 0.5 0.6

-0.6

-0.4

-0.2

]^2

-t [GeV

ϕ ) cos sϕ-ϕ D, sin ( CS,T A

-210^{-1}10

-0.6

-0.4

-0.2

0

x

COMPASS ( ) HERMES 2 | = 0.10 ( 0.14 ) GeV min|t

0 1 2 3 4 5 6 7 8

-0.6

-0.4

-0.2

0

COMPASS: 160 GeV, 280 days ECAL1 and ECAL2

]^2

[GeV 2Q