310^410 -8 10

-7 10

-6 10

-5 10

-4 10

standard MM std + GEM, HT GEM 1000/1320V std + GEM, HT GEM 1000/1300V std + GEM, HT GEM 1000/1280V std + GEM, HT GEM 1000/1260V

Spark probability

Gain