-0.2

-0.1 0 0.1 0.2 0.3

0 20 40 60 80 100 120 140 160 180

VGG Factorized (x,t)-dependence

VGG Reggeized (x,t)-correlation

Mueller fit on world data (with JLab Hall A) (without JLab Hall A)

ϕ

Beam Charge and Spin Asymmetry

E_μ=160 GeV 1 Q^2 4 GeV^2 0.03 x_B 0.07 ≤ ≤ ≤ ≤