Entries 2832 Mean 0.3198 RMS 0.1289

Fx -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0 20 40 60 80 100 120 140 160 180 Preliminary

COMPASS DY test run 2009

M>2.7 GeV