RC_delta_phi_prop

Entries 93029 Mean 2.563e-05 RMS 0.1801 / ndf

2χ 828.6 / 197 Prob 0 p0 4.9± 938.2 p1 0.0006480 ± -0.0002808 p2 0.001± 0.155

rad -0.5 -0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5 0

200

400

600

800

1000 ±

< 2.5 T 0.3 < P ϕΔ